0

0.01

0.02

0.03

0.5 1 1.5 0

0.01

0.02

0.03

J∝ r^{-3}

J∝ r^{-2} μ=0.99

μ=0.99 μ=0.266

μ=0.266 μ=0.5 μ=0.5 μ=0.766

μ=0.766