0 2 4 6 8 10 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Energy [keV]

Radiation flux normalized to maximum

A narrow line at 6.4keV, locally isotropic emission ( a/M=0.4)

6<r<10 20<r<25

observer inclination:θ_0= 25^o = 45^o = 65^o range of radii (units ofGM/c^2):