2 3 4 5 6 7 8 9 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1 Azimuthal segments of a ring (a narrow line at 6.4keV,..., a/M=0.4)

Radiation flux (normalized to flux from the ring)

Energy [keV]

range of radii (units ofGM/c^2): 6<r<10 observer inclination:θ_0= 65^o

0<ϕ<2π (complete ring) π<ϕ<2π (receding segment) 0<ϕ<π (approaching segment) 3π/2<ϕ<5π/2 π/2<ϕ<3π/2

Different azimuthal segments are considered: